-- Drop rows using the new value first so they don't violate the restored
-- (narrower) constraint, then revert the whitelist.
DELETE FROM diagnostic_events WHERE kind = 'playback';
ALTER TABLE diagnostic_events DROP CONSTRAINT diagnostic_events_kind_check;
ALTER TABLE diagnostic_events ADD CONSTRAINT diagnostic_events_kind_check
    CHECK (kind IN (
        'connectivity', 'upnp_sync', 'power', 'lifecycle',
        'heartbeat', 'http'
    ));
