-- Retire the configurable scan scheduler. New-file pickup is now handled by
-- the fsnotify watcher + a hardcoded safety-net delta walk (cmd/minstrel),
-- so the operator-configurable schedule (and its admin UI) is gone.
DROP TABLE IF EXISTS scan_schedule;
